Copyright: (c) 1999 ELSA AG


Contents
Ihr ELSA POWERdraft für AutoCAD 2000 Treiber

Bitte lesen Sie auch in der LIESMICH.TXT Datei den letzten Abschnitt Änderungen zur Hilfe Datei. Dort stehen möglicherweise neuere Informationen als in dieser Hilfe.

Schnellstart

Installation        Befehlsübersicht        POWERdraft Einstellungen        Versionen/letzte Änderungen        Technischer Support

Überblick

Mit POWERdraft for AutoCAD steht Ihnen eines der leistungsfähigsten Werkzeuge zur Produktivitätssteigerung unter AutoCAD 2000 zur Verfügung. Ihr POWERdraft-Treiber ist nahtlos in die AutoCAD-Benutzeroberfläche integriert und bietet gegenüber herkömmlicher Treibertechnologie bemerkenswerte Verbesserungen. Zunächst ist POWERdraft eine extrem schnelle und zuverlässige Treiberplattform für AutoCAD. Die Kombination aus bewährter 32-bit-Displaylist-Technologie und einer exakten Abstimmung auf Ihre ELSA-Grafikkarte stellt eine ausgezeichnete Lösung für anspruchsvollste AutoCAD-Benutzer dar.

Darüber hinaus beinhaltet Ihr POWERdraft-Treiber die leistungsfähigen Utilities MagniView(*), MultiView und das Cockpit(*), die entwickelt wurden, um die Arbeitsumgebung von AutoCAD sinnvoll zu ergänzen, ohne Ihre Arbeit zu behindern. Jedes Utility ist vollständig dynamisch und dank der Integration durch ELSAs SmartFocus-Technologie völlig transparent für AutoCAD und während jeder beliebigen AutoCAD-Operation nutzbar.

POWERdraft 3D Hardware Renderer

Im POWERdraft Paket enthalten ist der 3D Hardware Renderer, der alle 3D-Ansichts-Modi in AutoCAD 2000 beschleunigt, wie z.B. 3D-Orbit oder Gouraud-schattiert.

POWERdraft MultiView

MultiView ist vollständig in AutoCADs MDI-Umgebung integriert und bietet Ihnen eine konfigurierbare, grafische Auswahl Ihrer bisherigen Ansichten, von denen jede als kleine Grafik auf einer Schaltfläche dargestellt wird. Dies ermöglicht Ihnen schnellsten Zugriff auf jede frühere Ansicht und kann zur ständigen Aufzeichnung und Wiederherstellung gewählter Ansichten genutzt werden.

Desweiteren bietet MultiView eine sehr komfortable Handhabung von Benannten Ausschnitten.

POWERdraft Werkzeugkasten

Über den ELSA POWERdraft Werkzeugkasten können Sie einfach per Mausklick einige POWERdraft-Befehle aufrufen.

POWERdraft Hotkeys

Für einige sehr nützliche Operationen wie Pan, Zoom und Alles Neuzeichnen bietet POWERdraft konfigurierbare Tastatur-Kurzbefehle, sogenannte Hotkeys. Sie sind jederzeit verfügbar und arbeiten transparent.

POWERdraft Zeichenoptimierung

POWERdraft bietet einen konfigurierbaren Cache für das Aktualisieren der Anzeige, welcher die Ausführung von Lisp-Skripten erheblich beschleunigen kann.

Über Plotten

Technischer Hinweis: Im Gegensatz zu R14 ist AutoCADs Display Treiber (Whip) unter AutoCAD 2000 auch für’s Plotten zuständig. POWERdraft ersetzt nur Whips Bildschirm-Funktionen, jedoch nicht seine Plot-Funktionen. Das bedeutet, dass POWERdraft in keinster Weise AutoCADs Plot-Funktionalität beeinflusst.

(*) zur Zeit noch nicht verfügbar - geplant für zukünftige Versionen von POWERdraft

Drücken Sie F1, um Hilfe zur Hilfefunktion zu erhalten.


POWERdraft 3D Hardware Renderer

Der POWERdraft 3D Hardware Renderer, wenn konfiguriert, beschleunigt alle 3D Ansichts-Modi von AutoCAD 2000. Diese sind 3D-Orbit, 3D-Drahtkörper, Verdeckt, Flachschattiert, Gouraud-schattiert mit aktiven und inaktiven Kanten.

Nach erfolgreicher Installation von POWERdraft ist der 3D Hardware Renderer bereits konfiguriert.

Ändern von AutoCADs 3D-Konfiguration

Falls Sie AutoCADs aktuelle 3D-Konfiguration ändern möchten, verfahren Sie wie folgt:

•	Öffnen Sie die AutoCAD-Optionen über Menüpunkt ‘Werkzeuge’ / ‘Optionen...’

•	Selektieren Sie die Registerkarte ‘System’.

•	Klicken Sie auf die Schaltfläche ‘Eigenschaften’ in der Gruppe ‘Aktueller 3D-Graphikbildschirm’. Daraufhin öffnet sich das Fenster ‘Konfiguration des 3D-Graphiksystems’.

•	Darin können Sie unter ‘Beschleunigung’ den gewünschten Treiber auswählen.

Hinweis:

•	AutoCADs Originalkonfiguration ist Software.

•	POWERdrafts Konfiguration ist Hardware mit Treiber ELSA.HDI (ELSA.HDI ist der Dateiname vom POWERdraft 3D Hardware Renderer)


POWERdraft Toolbar
POWERdraft Werkzeugkasten

Der POWERdraft Werkzeugkasten bietet schnellen und bequemen Zugriff auf einige POWERdraft spezifische Befehle. Beim ersten Start von POWERdraft wird der Werkzeugkasten automatisch geöffnet.

Wenn der ELSA POWERdraft Werkzeugkasten geschlossen ist, können Sie ihn mit dem Befehl PdMenu wieder öffnen. Bleibt der ELSA Werkzeugkasten dann immer noch unsichtbar, verwenden Sie den Befehl PdMenuOn.

Dieser Werkzeugkasten enthält folgende Schaltflächen:

	Öffnet/schließt das MultiView - äquivalent zum Befehl PdMultiView
	Öffnet die ELSA POWERdraft Einstellungen - äquivalent zum Befehl PdConfig
	Öffnet die ELSA POWERdraft for AutoCAD 2000 Hilfe - äquivalent zum Befehl PdHelp

Diese und weitere POWERdraft Befehle sind im Abschnitt Befehlsübersicht beschrieben.


POWERdraft MultiView

Überblick

MultiView ist vollständig in AutoCADs MDI-Umgebung (Multi-Document-Interface) integriert. Es kann nach Belieben als Floating-Fenster oder fixiert an AutoCADs Rahmenfenster angezeigt werden. Als fixiertes Tool teilt es sich mit evtl. weiteren ebenfalls an AutoCADs Rahmenfenster fixierten Tools den dafür vorgesehenen Platz.

MultiView  bietet die Auflistung sowie Ein-Klick-Rückrufe bisheriger Ansichten. Zusätzlich bietet es eine komfortable Handhabung der benannten Ausschnitte in Ihrer Zeichnung. In Bezug auf diese beiden Hauptaufgaben ist das MultiView-Fenster in zwei scrollbare Teilfenster aufgeteilt. Das obere Teilfenster stellt die visuelle Liste bisheriger Ansichten dar, das untere Teilfenster bietet die Verwaltung von benannten Ausschnitten. Eine Trennleiste trennt die beiden Teilfenster und ermöglicht die Anpassung ihrer relativen Größen.

MultiView starten

Das erste Mal wenn Sie AutoCAD mit konfiguriertem POWERdraft starten, startet MultiView automatisch.

Ist MultiView nicht sichtbar, nachdem AutoCAD gestartet wurde, geben Sie den Befehl PDMULTIVIEW ein um MultiView zu starten. Alternativ kann MultiView auch durch Klicken des Symbols [image] innerhalb POWERdrafts Werkzeugkasten gestartet werden. Beim nächsten Starten von AutoCAD restauriert MultiView automatisch seinen letzten Zustand.

MultiView schließen

Ist MultiView sichtbar, geben sie den Befehl PDMULTIVIEW ein oder klicken sie erneut auf das Symbol [image] innerhalb POWERdrafts Werkzeugkasten, um MultiView zu schließen.

Fixieren und lösen des MultiView-Fensters

Zunächst einmal ist es generell möglich das Fixieren zuzulassen oder zu unterdrücken. Das Klicken der rechten Maustaste über MultiViews Fenster öffnet ein Kontextmenü:

Klicken Sie auf den Eintrag ‘fixieren zulassen’ um das Fixieren zuzulassen bzw. zu unterdrücken. Beachten Sie, dass das Fixieren des MultiView-Fensters an AutoCADs Rahmenfenster nur möglich ist, wenn der Menüeintrag ‘fixieren zulassen’ durch ein Häkchen gekennzeichnet ist. Es ist möglich, MultiView an jeder beliebigen Seite des AutoCAD-Rahmenfensters zu fixieren. Ist das MultiView-Fenster fixiert, kann es durch einen Doppelklick auf den MultiView-Griff wieder gelöst werden. Ist MultiView nicht fixiert, kann es umgekehrt durch einen Doppelklick auf MultiViews Titelzeile wieder fixiert werden.

Die Liste bisheriger Ansichten

Wenn sich eine Ansicht in AutoCAD ändert, speichert MultiView die vorherige Ansicht temporär. Eine Schaltfläche die Informationen zu dieser Ansicht speichert wird erzeugt und am Anfang der Liste bisheriger Ansichten eingefügt. Die gespeicherte Ansicht wird durch eine Bitmap auf der Schaltfläche dargestellt.

Beachten Sie, dass für Ansichten im Papierbereich eine solche Bitmap nur die grafischen Elemente anzeigt, die zu diesem Papierbereich gehören, wie z.B. die Grenzen der Ansichtsfenster. Grafische Elemente innerhalb der Ansichtsfenster im Papierbereich werden hier nicht angezeigt.

Weitere Besonderheiten sind nachfolgend aufgelistet.

Ein-Klick-Rückrufe

Durch Klicken einer Schaltfläche innerhalb der Liste bisheriger Ansichten wird die darunterliegende Ansicht unmittelbar im aktuellen Ansichtsfenster wiederhergestellt.

Erzeugen eines benannten Ausschnitts mittels drag&drop

Wird die linke Maustaste über einer Ansichts-Schaltfläche gedrückt gehalten, wird ein Verschiebe-Prozess gestartet, der ein benutzerfreundliches Verschieben der temporär gespeicherten Ansicht in die Liste benannter Ausschnitte ermöglicht.

Umordnen der bisherigen Ansichten mittels drag&drop

Neue Ansichten werden üblicherweise am Anfang der Liste bisheriger Ansichten eingefügt. MultiView bieted ein einfaches Umordnen der bisherigen Ansichten. Mittels drag&drop kann eine bestimmte Ansicht an eine beliebige Position innerhalb der Liste bisheriger Ansichten verschoben werden.

Kontextmenü

Ein Rechtsklick auf eine Ansichts-Schalfläche öffnet ein Kontextmenü, welches das Wiederherstellen der darunterliegenden Ansicht oder das Löschen der Schaltfläche aus der Liste bisheriger Ansichten erlaubt.

Das Aktualisieren der Schaltflächenbitmap (s.u.) ist ebenfalls über das Kontextmenü erreichbar.

Aktualisieren der Schaltflächenbitmap

Aus Performancegründen wird die verkleinerte Ansicht (Bitmap) auf der Schaltfläche nicht jedesmal aktualisiert wenn Zeichnungselemente hinzukommen. Wenn Sie die Bitmap aktualisieren möchten, so dass sie den aktuellen Inhalt der darunterliegenden Ansicht zeigt, rechtsklicken Sie auf die Schaltfläche, um das Kontextmenü zu öffnen. Wählen Sie im Kontextmenü den Punkt ‘Restaurieren & Aktualisieren’. Die Ansicht wird restauriert und die Bitmap aktualisiert. Alle anderen Schaltflächen innerhalb der Liste werden durch diese Aktion als ungültig markiert. Die Bitmap einer solchen Schaltfläche wird aktualisiert, das nächste Mal wenn die Schaltfläche angeklickt wird, um die darunterliegende Ansicht zu restaurieren.

Einschränkungen

Beachten Sie, dass die Liste bisheriger Ansichten verloren geht, sobald die zugehörige Zeichnung geschlossen wird oder AutoCAD beendet wird.

Verwaltung benannter Ausschnitte

MultiView bietet einen komfortable Art, die benannten Ansichten in Ihrer Zeichnung zu verwalten.

Benannte Ausschnitte bleiben erhalten

Im Gegensatz zur Liste bisheriger Ansichten, werden benannte Ausschnitte in Ihrer Zeichnung abgespeichert. Benannte Ausschnitte sind damit solange zugänglich, bis sie aktiv gelöscht werden.

Einfacher Zugriff auf benannte Ansichten

Alle in einer Zeichnung gespeicherten benannten Ausschnitte werden vom MultiView aufgelistet. Zusatzinformationen wie Modell oder Layout oder ob es sich um einen perspektivischen Ausschnitt handelt, werden ebenfalls aufgelistet. Mittels MultiView sind benannte Ausschnitte zu jeder Zeit einfach zugänglich.

Erzeugen eines benannten Ausschnitts mittels drag&drop

Ein weiterer Vorteil ist das Erstellen eines benannten Ausschnittes aus einer bisherigen Ansicht. Dies geschieht durch einfaches Verschieben (drag&drop) der bisherigen Ansicht aus der Liste bisheriger Ansichten in die Liste benannter Ausschnitte. Nachdem die Ansicht in der Liste benannter Ausschnitte abgelegt wurde, kann diese benannt werden. Beachten Sie, dass ein Ausschnitt nach schließen der zugehörigen Zeichnung bzw nach beenden von AutoCAD verloren geht, wenn dieser nicht benannt wird.

Ein-Klick-Rückrufe

Sie können einen bennanten Ausschnitt durch Anklicken des zugehörigen Eintrags in der Liste wiederherstellen.

Einfaches Umbenennen eines Ausschnitts

Durch erneutes Anklicken des Namen eines in der Liste bereits hervorgehobenen Ausschnitts, wird dieser editierbar und der Ausschnitt kann somit umbenannt werden.

Kontextmenü

Wiederherstellen und Umbenennen eines benannten Auschnitts ist auch erreichbar über ein Kontextmenü, welches durch Rechtsklicken des zugehörigen Eintrags in der Liste geöffnet wird. Das Löschen eines benannten Ausschnitts ist ebenfalls über dieses Kontextmenü erreichbar. Die Operationen Umbenennen und Löschen können mittels des AutoCAD-Befehls ‘zurück’ widerrufen werden.

Nach Namen sortieren

Klicken Sie auf die Spaltenüberschrift ‘Name’, um alle Ausschnitte nach ihren Namen zu sortieren.

MultiViews Symbolleiste

MultiViews Symbolleiste bietet einen scnellen Zugriff auf MultiViews Funktionalität.

 Füge aktuelle Ansicht hinzu

Fügt die aktuelle Ansicht zur Liste bisheriger Ansichten hinzu.

Der Befehl PdAddView ist äquivalent.

 Lösche die Liste bisheriger Ansichten

Leert die gesamte Liste bisheriger Ansichten. Beacten Sie, dass es für diese Operation keine Widerruf-Operation gibt.

 Liste bisheriger Ansichten sperren

Unterdrückt das vorgegebene Verhalten, welches ein automatisches Speichern der vorherigen Ansicht nach jeder Änderung der Ansicht impliziert.

Der Befehle PdLockHistory1 ist äquivalent.

 Liste bisheriger Ansichten entsperren

Wenn Sie, wie oben beschrieben, die Liste bisheriger Ansichten gesperrt haben, wechselt das Symbol und zeigt ein abgeschlossenes Vorhängeschloss, wie Sie sehen. Dies erleichtert das Merken des momentanen Sperr-Zustands. Entsperren Sie die Liste bisheriger Ansichten durch erneutes Klicken auf das Symbol.

Der Befehl PdLockHistory0 ist äquivalent.

Hilfedatei öffnen

Ein Mausklick auf dieses Symbol öffnet die MutlView Hilfe.

Einstellungen:  MultiView

Der MultiView Konfigurationsdialog ist integriert in AutoCADs.Optionen-Dialog. Öffnen Sie diesen Dialog

über AutoCADs Menü ‘Werkzeuge/Optionen’. Aktivieren Sie anschließend die MultiView Registerkarte um Zugriff auf MultiViews Einstellungen zu bekommen.

MultiView  bietet die folgenden Optionen an:

Benutze Bitmaps bei den benannten Views

Wenn aktiv, wird zu jedem benannten Ausschnitt ein Symbol links neben dem Namen des Ausschnitts plaziert. Dieses Symbol soll den gespeicherten Ausschnitt grafisch andeuten. Diese Option ist in den vorgegebenen Einstellungen deaktiviert.

Erlaube Umschalten von Layout nach Modell

Wenn aktiviert, werden Nicht-Papierbereichsansichten, wenn sie aus einer Papierbereichsansicht heraus wiederhergestellt werden, in das zuletzt aktive Ansichtsfenster restauriert. Dies kann ein vorausgehendes Umschalten von Layout nach Modell implizieren, falls das zuletzt aktive Ansichtsfenster im Modellbereich lag. Diese Option ist in den vorgegebenen Einstellungen deaktiviert.


SmartFocus

Die ELSA-SmartFocus-Technologie, die in allen POWERdraft Fenstern eingesetzt wird, erspart Ihnen das lästige Umschalten des Eingabefokus zwischen Treiberfenstern und AutoCADs Fenster. Nachdem Sie eine Funktion in einem der Treiberfenster benutzt haben, wird durch Tastatureingaben oder Fadenkreuzbewegungen automatisch AutoCAD das aktive Fenster. Ein ausdrückliches Anklicken wie in anderen Treibern ist unnötig.


POWERdraft Installation

Der POWERdraft-Treiber unterstützt AutoCAD 2000 unter Windows NT4.0 und Windows 95/98

Voraussetzungen

Zur Installation des ELSA POWERdraft-Treibers benötigen Sie:

•	AutoCAD 2000, bereits installiert

•	Microsoft Windows NT4.0 oder Windows 95/98

•	ELSA Synergy oder ELSA GLoria Grafikkarte - eine Liste der unterstützten ELSA Grafikkarten finden Sie im Kopf der LIESMICH.TXT Datei.

•	ELSAs Bildschirmtreiber für die verwendete Windows-Version

•	CD “WINNERware” oder Diskette “POWERdraft for AutoCAD 2000”

Installation

•	Installation von CD: Starten Sie CDSETUP.EXE aus dem Wurzelverzeichnis Ihrer WINNERware-CD. Sie können dazu im Windows Explorer CDSETUP.EXE doppelklicken.

•	Installation von Diskette: Der POWERdraft Installationssatz umfasst mehrere Disketten. Starten Sie SETUP.EXE von der ersten Diskette. Während der Installation fordert Setup Sie auf, die weiteren Disketten einzulegen.

•	Installation aus einem separaten Verzeichnis: Das POWERdraft Verzeichnis enthält mehrere Unterverzeichnisse DISK<n>. Starten Sie SETUP.EXE aus dem Unterverzeichnis DISK1.

•	Der Treiber wird in ein getrenntes Verzeichnis installiert.

•	Setup legt eine Programmgruppe mit vier Symbolen an:
- POWERdraft Hilfe: öffnet diese Hilfe
- POWERdraft konfigurieren: konfiguriert POWERdraft als AutoCADs Bildschirmtreiber.
- Originaltreiber konfigurieren: konfiguriert AutoCADs Original-Bildschirmtreiber (Whip).
- Uninstall POWERdraft: Entfernt POWERdraft vom System
HINWEIS: Die beiden ...konfigurieren Symbole funktionieren nur, während AutoCAD nicht läuft.

Zugriffsrechte

Zur Installationszeit benötigt SETUP Schreibzugriff auf folgende Verzeichnisse:

•	AutoCAD Verzeichnis: SETUP erzeugt dort die Datei PD15PATH.INI, in der der Pfad zum Treiber-Verzeichnis steht.

•	AutoCAD Unterverzeichnis ‘DRV’: SETUP kopiert den POWERdraft 3D Hardware Renderer ELSA.HDI dorthin.

•	Treiber-Verzeichnis: SETUP kopiert fast alle POWERdraft spezifischen Dateien dorthin.

•	Windows-Systemverzeichnis: SETUP ersetzt evtl. die System-DLLs MSVCRT.DLL und/oder MFC42.DLL durch aktuelle Versionen.

•	Windows-Verzeichnis: SETUP erzeugt dort die Datei DSELSA15.INI, in der die POWERdraft Einstellungen abgespeichert werden.

Zur Laufzeit benötigt POWERdraft Schreibzugriff auf folgende Verzeichnisse:

•	Treiber-Verzeichnis

•	Windows-Verzeichnis: POWERdraft aktualisiert beim Beenden seine Einstellungen in DSELSA15.INI

Zur Konfiguration benötigt das Konfigurationsprogramm Schreibzugriff auf das folgende Verzeichnis:

•	AutoCAD Verzeichnis: Beim Umkonfigurieren des AutoCAD-Bildschirmtreibers (POWERdraft / AutoCADs Originaltreiber) wird die Treiber-DLL DSWHIP.DLL ausgetauscht.


POWERdraft Befehlsübersicht

POWERdraft for AutoCAD 2000 bringt zusätzliche Befehle, die Sie in AutoCAD benutzen können.

PdAddView (MultiView Befehl (*))	Speichert die aktuelle Ansicht im MultiView, sofern sie nicht schon gespeichert wurde.
PdConfig	Öffnet die ELSA POWERdraft Einstellungen, um POWERdraft Einstellungen zu verändern.
PdCpAddView (**)	veraltet - verwenden Sie stattdessen das äquivalente PdAddView
PdCpFix (**)	veraltet - verwenden Sie stattdessen das äquivalente PdLockHistory
PdHelp	Öffnet die ELSA POWERdraft Hilfe.
PdLockHistory (MultiView Befehl (*))	Friert/Taut MultiViews Liste früherer Ansichten
PdLockHistory0 (MultiView Befehl (*))	Taut MultiViews Liste früherer Ansichten, falls sie gefroren ist
PdLockHistory1 (MultiView Befehl (*))	Friert MultiViews Liste früherer Ansichten, falls sie nicht gefroren ist
PdMenu	öffnet den POWERdraft Werkzeugkasten
PdMenuOn	wie PdMenu, außer dass der POWERdraft Werkzeugkasten in die Mitte des AutoCAD-Zeichenbereichs positioniert wird. Dies ist hilfreich, wenn z.B. durch Andocken anderer Werkzeugkästen der POWERdraft Werkzeugkasten aus dem sichtbaren Bereich verschwindet.
PdMultiView	Öffnet/Schließt das MultiView
PdMultiView0	Schließt das MultiView, falls es geöffnet ist
PdMultiView1	Öffnet das MultiView, falls es geschlossen ist
PdVer	gibt die Version von POWERdraft im AutoCAD-Textfenster aus.

(*) Diese Befehle sind nur verfügbar, wenn das entsprechende Tool geöffnet ist.

(**) Diese Befehle sind nur implementiert wegen Abwärts-Kompatibilität zu POWERdraft for AutoCAD R14. Sie werden in zukünftigen Versionen entfernt.


POWERdraft Einstellungen

Die POWERdraft Einstellungen dienen zur persönlichen Benutzerkonfiguration des Treibers und der mitgelieferten Tools. Sie sind voll integriert in AutoCADs ‘Optionen’ Dialog.

Geöffnet werden die POWERdraft Einstellungen mit Hilfe des Befehls PdConfig oder durch Anklicken der Schaltfläche [image] im POWERdraft-Werkzeugkasten oder einfach durch Öffnen der AutoCAD Optionen.

Der AutoCAD ‘Optionen’ Dialog wird erweitert durch die folgenden POWERdraft Einstellungen Registerkarten:

•	  POWERdraft (siehe unten)

•	  MultiView

Einstellungen:  POWERdraft

Die Registerkarte der POWERdraft Einstellungen beinhaltet folgende Gruppen:

•	Treiberversion: Dieses Feld zeigt die Versionsnummer von POWERdraft.

•	Hotkeys: In dieser Gruppe können die POWERdraft Hotkeys konfiguriert werden.

•	Aktualisierung der Anzeige: Mit diesem Slider können sie den Grad der Zeichenoptimierung einstellen.

HINWEIS: Die Einstellungen werden in der Datei dselsa15.ini im Windows-Verzeichnis abgespeichert. Editieren Sie diese Datei nicht, während POWERdraft läuft, da der Treiber die Einstellungen überschreibt, wenn AutoCAD beendet wird. Normalerweise besteht keine Notwendigkeit, diese Einträge manuell zu ändern.


POWERdraft Hotkeys

POWERdraft bietet einige sehr nützliche und oft benötigte Aktionen, die über konfigurierbare Tastenkombinationen (Hotkeys) aufrufbar sind. Sie sind jederzeit verfügbar und arbeiten transparent in AutoCAD. Über die POWERdraft Einstellungen können diese Hotkeys konfiguriert werden.

Konfigurieren der Hotkeys

(1)	Aktivieren Sie die [image] POWERdraft Registerkarte innerhalb der AutoCAD Optionen.

(2)	Innerhalb der Hotkeys Gruppe wählen Sie die zu konfigurierende Aktion aus.

(3)	Dann klicken Sie in das Hotkey Feld und tippen die gewünschte Tastenkombination für die Aktion.

(4)	Einige Zoom und Pan Aktionen erfordern einen zusätzliche Parameter, der im Edit-Feld verändert werden kann (1) (2).

Sehen Sie hier eine Liste der vorgegebenen Tastenkombinationen zu vorgegebenen Aktionen:

Aktion	Beschreibung	Voreinstellung Tastenkombination	Parameter
Pan nach unten	Zeichnung um Pan-Offset nach unten verschieben.	<Alt><NACH-UNTEN>	Pan-Offset = 0.25 (1)
Ppan nach links	Zeichnung um Pan-Offset nach links verschieben.	<Alt><NACH-LINKS>	Pan-Offset = 0.25 (1)
Pan nach rechts	Zeichnung um Pan-Offset nach rechts verschieben.	<Alt><NACH-RECHTS>	Pan-Offset = 0.25 (1)
Pan nach oben	Zeichnung um Pan-Offset nach oben verschieben.	<Alt><NACH-OBEN>	Pan-Offset = 0.25 (1)
Pan zum Mittelpunkt	Die aktuelle Cursor-Position wird zum neuen Zentrum der Ansicht.	<UMSCHALT><F1>
Alles neuzeichnen	Erzwingt ein Neuzeichnen der gesamten Ansicht.	<UMSCHALT><F2>	-
Zoom +	Es wird um den Zoom-Faktor in die Zeichnung hineingezoomt. Die momentane Cursor-Position dient als Zoom-Zentrum.	<UMSCHALT><F3>	Zoom-Faktor = 1.5 (2)
Zoom + über Mittelpunkt	Es wird um den Zoom-Faktor in die Zeichnung hineingezoomt. Der Mittelpunkt der Ansicht  dient als Zoom-Zentrum.	keine	Zoom-Faktor = 1.5 (2)
Zoom -	Es wird um den Zoom-Faktor in die Zeichnung hinausgezoomt. Die momentan Cursor Position dient als Zoom-Zentrum.	<UMSCHALT><F4>	Zoom-Faktor = 1.5 (2)
Zoom - über Mittelpunkt	Es wird um den Zoom-Faktor in die Zeichnung hinausgezoomt. Der Mittelpunkt der Ansicht  dient als Zoom-Zentrum.	keine	Zoom-Faktor = 1.5 (2)

Notes:

(1)	Ein Pan Offset von 1.0 entspricht der aktuellen Ansichtsgröße.

(2)	Der angegebene Zoom-Faktor wird für ‘Zoom +’ verwendet. ‘Zoom -’ verwendet ‘1 / Zoom-Faktor’.

(3)	Alles neuzeichnen kann nützlich sein, um Anzeigefehler schnellstmöglich wieder beheben zu können, wie z.B. eine falsche Anzeigereihenfolge der Zeichnungselemente nach einer Editier-Operation.

Anmerkung: Falls eine eingestellte Tastenkombination auch in AutoCAD eine Funktion hat, so steht diese in AutoCAD nicht mehr zur Verfügung.


POWERdraft Zeichenoptimierung

POWERdraft bietet einen konfigurierbaren Cache für das Aktualisieren der Anzeige. Falls dieser Cache aktiv ist, reduziert POWERdraft die Häufigkeit, mit der die Anzeige aktualisiert wird, sofern AutoCAD sich in einem nicht-interaktiven Modus befindet, z.B. während des Ausführens eines Lisp-Skriptes. Je nach Lisp-Skript kann die Abarbeitung desselben dadurch erheblich beschleunigt werden.

Sobald AutoCAD in einen interaktiven Modus wechselt (d.h. wenn AutoCAD auf Benutzer-Eingaben wartet), wird die Anzeige immer sofort aktualisiert.

Konfigurieren der Zeichenoptimierung

(1)	Aktivieren Sie die [image] POWERdraft Registerkarte in den AutoCAD Optionen.

(2)	Bewegen Sie den Schieberegler innerhalb der Gruppe Aktualisieren der Anzeige auf eine der vier Positionen. Die Extrem-Positionen sind Unmittelbar und Intensives Caching:
Im Modus Unmittelbar wird die Anzeige immer sofort aktiviert. Dies ist der einzige Modus, in dem der Cache inaktiv ist.
Im Modus Intensives Caching wird die Anzeige im nicht-interaktiven Modus nur circa alle 2 Sekunden aktualisiert.
Die beiden Modi dazwischen bewirken eine geringere Intensität des Cachings.


Versionen / Letzte Änderungen

Version History

Version 15.00

Version 15.00.04

•	Erste Version des POWERdraft for AutoCAD 2000

•	Beinhaltet den 3D Hardware Renderer zur Beschleunigung der 3D-Ansichts-Modi.

•	Beinhaltet das gegenüber R14 komplett neu entwickelte MultiView

•	Beinhaltet konfigurierbare Hotkeys.

•	Beinhaltet konfigurierbare Zeichenoptimierung zur Beschleunigung von Lisp-Skripten.

•	Beinhaltet die POWERdraft Einstellungen zum Konfigurieren von POWERdraft. Diese sind in die AutoCAD Optionen integriert.

•	Beinhaltet neue Befehle.

Version 15.00.06

•	ELSA Synergy Force wird unterstützt.

•	ELSA GLoria II Pro wird unterstützt.

•	Der 3D Hardware Renderer zeigte einige Darstellungsfehler, sofern eine Bildschirmauflösung eingestellt war, bei der Software-OpenGL benutzt wird. Dies Problem ist behoben.

Version 15.00.07

•	Das Deinstallieren war unvollständig. Dieser Fehler ist behoben.

Bekannte Probleme und Einschränkungen

•	Diese Version von POWERdraft for AutoCAD 2000 beinhaltet keine 2D-Graphikbeschleunigung verglichen mit dem Originaltreiber. Dies ist geplant für zukünftige Versionen.

•	Diese Version unterstützt keinen Mehrschirm-Betrieb.